== WWAN Module

This module configures WWAN adapters that support MBIM

=== Current limitations

* IPv4 tested only
* Currently, it is not simple to get network failures or address updates
via a hook or so.
** A systemd timer to update the configuration is executed every 2
minutes to prevent longer downtimes.
